x ΜmΝ y ΜmΝ log likelihood

x_{min} = 0.105 ± 0.349 ΜmΝ y_{min} = -6.436 ± 0.371 ΜmΝ δx_{min} = 56.99 ± 2.82 ΜmΝ δy_{min} = 56.12 ± 2.63 ΜmΝ

log likelihood for OM 340 at z = (not fit 0) m

-20-15

-10 -5 0 5 10 15 20

-15 -10 -5 0 5 10 15 20 8.05 8.1 8.15 8.2 8.25 8.3 8.35 8.4 8.45