x ΜmΝ y ΜmΝ log likelihood

x_{min} = -0.728 ± 1.309 ΜmΝ y_{min} = -3.240 ± 0.530 ΜmΝ z_{min} = 0.126 ± 0.357 ΜmΝ δx_{min} = 46.45 ± 0.98 ΜmΝ δy_{min} = 46.02 ± 0.78 ΜmΝ δz_{min} = 46.59 ± 541.80 ΜmΝ

log likelihood for OM 340 at z = 0 m

-20-15

-10 -5 0 5 10 15 20

-15 -10 -5 0 5 10 15 20

8 8.1 8.2 8.3 8.4