376 GeV

Z of primary

E_{cut,pri} / A_{pri} Μ GeV Ν

E_{cut,pri}(99.9%) / A_{pri}

E_{cut,pri}(99%) / A_{pri}

N_{μ events} in 2 ⋅ 10^9 showers

0

200

400

600

800

1000

0 5 10 15 20 25

10^3

10^4

10^5

10^6

10^7

0 5 10 15 20 25