energy E of the primary Μ GeV Ν fraction of primaries below E fraction=(α(E-E_{cut}))^β

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

1

260 280 300 320 340 360 380 400 fraction of primaries used for the fit energy cutoff of primaries Μ GeV Ν

energy cutoff χ^2 of the fit

0 50 100 150 200 250 300 350 400

0 0.020.040.060.08 0.1 0.120.140.160.18 0.2 x 10^{-3}

10^{-2}

10^{-1}

1

10

10^2

10^3 fraction of primaries used for the fit fit parameters

scaling power

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

0 0.02 0.04 0.060.08 0.1 0.12 0.140.16 0.18 0.2 x 10^{-3}

5 10 15 20 25 30 35 40 45 50 energy E of the primary Μ GeV Ν fraction of primaries below E fraction=(α(E-E_{cut}))^β α=3.31E-03 β=24.47

E_{cut}= 126. ± 0. GeV E_{cut}(10^{-5})=315. GeV

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

1

260 280 300 320 340 360 380 400