energy E of the primary Μ GeV Ν fraction of primaries below E fraction=(α(E-E_{cut}))^β

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

1

200 220 240 260 280 300 320 340 360 380 400 fraction of primaries used for the fit energy cutoff of primaries Μ GeV Ν

energy cutoff χ^2 of the fit

0 50 100 150 200 250 300 350 400

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 x 10^{-3}

10^{-2}

10^{-1}

1

10

10^2

10^3 fraction of primaries used for the fit fit parameters

scaling power

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 x 10^{-3}

5 10 15 20 25 30 35 40 45 50 energy E of the primary Μ GeV Ν fraction of primaries below E fraction=(α(E-E_{cut}))^β α=2.22E-03 β=3.56

E_{cut}= 225. ± 0. GeV E_{cut}(10^{-5})=241. GeV

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

1

200 220 240 260 280 300 320 340 360 380 400