length ΜmΝ radius ΜmΝ log_{10}(fraction missed)

-400

-200 0 200 400 -200 0 200 400 -6 -5 -4 -3 -2 -1 0 detector length (measured from the center) ΜmΝ detector radius ΜmΝ

10^{-1}

10^{-2}

10^{-3}

10^{-4}

10^{-5}

0.5 1.5 2.5 3.5 4.5 -400

-300

-200

-100 0 100 200 300 400

-400 -300 -200 -100 0 100 200 300 400