fit with ppc v7 seeded with AHA fit with ppc v17 seeded with bulk ice

depth Μ m Ν b_e(400) Μ m^{-1} Ν

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

120014001600180020002200240026002800 fit with ppc v7 seeded with AHA fit with ppc v17 seeded with bulk ice

depth Μ m Ν a^*(400) Μ m^{-1} Ν

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

120014001600180020002200240026002800