scattering scaling factor χ^2 min at 1.00

absorption scaling factor χ^2 min at 1.00

2

2.5

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2

2 2.5 3 3.5

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2