IceCube+hole IceCube AMANDA (Ped)

cos(θ) relative sensitivity

10^{-3}

10^{-2}

10^{-1}

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1