wavelength acceptance

0

0.02

0.04

0.06

0.08

0.1

0.12

250 300 350 400 450 500 550 600 650 wavelength photons

0 2 4 6 8 10 12 14 16

250 300 350 400 450 500 550 600 650 cumulative PDF wavelength Μ nm Ν

300 350 400 450 500 550 600 650

0 0.2 0.4 0.6 0.8 1