/ GeV ν E 10 log 1.5 2 2.5 3 3.5 4

-1 s^{-2} cm 2 /dE / GeV Φ d^3 E_{10} log

-1

-0.9

-0.8

-0.7

-0.6

-0.5

-0.4

AMANDA-II sensitivity (90% CL, Barr et al. input)

Barr et al.

Honda et al.