Theta_1it - Theta_32it (deg)

-150 -100 -50 0 50 100 150 htemp Entries 55180 Mean -0.4716 RMS 8.934

1

10

210

310

410

180./3.1416*(Muon1SPE_TNothingSNothing.Theta[0]-Muon32SPE_TNothingSNothing.Theta[0])