true theta (deg)

0 10 20 30 40 50 60 70 80 90 htemp

Entries 214 Mean 48.2 RMS 15.72

0 2 4 6 8 10 12 14 16 18 20 22 180./3.1416*(f2kRead_MCTR.Theta[0]) {180./3.1416*(Muon1SPE_TNothingSNothing.Theta[0])>90}

fakes 1 it

true theta (deg)

0 10 20 30 40 50 60 70 80 90 htemp

Entries 501 Mean 41.32 RMS 17.06

0 5 10 15 20 25 30 35 40 45 180./3.1416*(f2kRead_MCTR.Theta[0]) {180./3.1416*(Muon32SPE_TNothingSNothing.Theta[0])>90}

fakes 32 it