RLogLH

7 8 9 10 11 12 13 14 htemp Entries 214 Mean 8.615 RMS 0.8672

0

20

40

60

80

100

120 Muon1SPE_TNothingSNothing.RLogLH {180./3.1416*(Muon1SPE_TNothingSNothing.Theta[0])>90}

32 it

1 it