Length (m)

50 100 150 200 250 300 350 400 htemp Entries 214 Mean 119.6 RMS 54.44

0

10

20

30

40

50

Muon1SPE_TNothingSNothing.L[0] {180./3.1416*(Muon1SPE_TNothingSNothing.Theta[0])>90}

32 it

1 it