Smoothness

-0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 htemp Entries 214 Mean 0.1813 RMS 0.4134

0 20 40 60 80 100 120 140 160 180 200 220 240 htemp

TopfMuon1SPE_TNothingSNothing_Smooth_L.Smooth[0] {180./3.1416*(Muon1SPE_TNothingSNothing.Theta[0])>90}