RLogLH

7 8 9 10 11 12 13 htemp Entries 501 Mean 8.507 RMS 0.5916

0

10

20

30

40

50

60 Muon32SPE_TNothingSNothing.RLogLH[0] {180./3.1416*(Muon32SPE_TNothingSNothing.Theta[0])>90}

Normal Solution Alternative Solution