-2 -1 0 1 2 3 4 htemp Entries 501 Mean 0.08423 RMS 0.4544

1

10

210

Muon32SPE_TNothingSNothing.RLogLH[0]-Muon32SPE_TNothingSNothing.AltRLogLH[0] {180./3.1416*(Muon32SPE_TNothingSNothing.Theta[0])>90}